SELEX RICH Performance and Physics Results Jurgen Engelfried Universidad Autonoma de San Luis Potosi, Mexico For the SELEX RICH Group SELEX took data in the 1996/7 Fixed Target Run at Fermilab. After a short introduction to the experiment, we will present the excellent performance parameters of the SELEX RICH Detector, which had direct influence on the quality of the obtained physics results.